Finite-Elemente-Baukasten FEMSET

J. Dankert_{STAB3D}^{03.08.2003}

Stabkraefte

 Stab    Stabkraft

    1  4.832126910
    2  25.33921216
    3  52.40555593
    4 -50.80678261
    5 -29.43901811
    6 -6.275264846
    7  7.580657793
    8  13.62218469
    9 -3.889359383
   10 -11.15839399
   11  11.15839399
   12  0.579956660
   13 -17.71473328
   14  3.551969352
   15 -9.942575552
   16 -13.23002064
   17  13.14837990
   18 -0.369458128
   19 -20.04926108
   20  0.369458128
   21 -0.985221675
   22 -0.369458128
   23 -19.55665025
   24  0.369458128
   25 -1.970443350
   26 -0.369458128
   27 -19.06403941
   28  0.369458128
   29 -2.955665025
   30 -0.369458128
   31  2.142857143
   32 -18.57142857
   33  64.86060740
   34 -23.77393378
   35 -64.46651873
   36  21.26405281
   37  53.74433784
   38  21.26405281
   39 -53.35024917
   40  42.62806828
   41 -23.77393378
   42 -40.56747045
   43  16.45022436
   44  32.34235826
   45 -18.39190996
   46 -32.34235826
   47  16.45022436
   48  24.46356247
   49 -18.39190996
   50 -24.46356247
   51  16.45022436
   52  16.58476668
   53 -18.39190996
   54 -23.77393378

                        Stab    Stabkraft

                          55  4.083872219
                          56  23.28846564
                          57  51.98698997
                          58 -50.76966900
                          59 -27.00681924
                          60 -6.071832629
                          61  7.065771036
                          62  13.41621523
                          63 -2.238032093
                          64 -10.24537341
                          65  10.24537341
                          66  0.364183286
                          67 -16.77679111
                          68  2.581597777
                          69 -9.608378195
                          70 -11.10438614
                          71  11.44359213
                          72 -0.369458128
                          73 -20.04926108
                          74  0.369458128
                          75 -0.369458128
                          76 -19.55665025
                          77  0.369458128
                          78 -0.369458128
                          79 -19.06403941
                          80  0.369458128
                          81 -0.369458128
                          82  2.142857143
                          83 -18.57142857
                          84  64.11327753
                          85 -21.60833256
                          86 -64.68767516
                          87  19.32708019
                          88  54.93398058
                          89  19.32708019
                          90 -55.50837822
                          91  45.75468364
                          92 -21.60833256
                          93 -45.14681527
                          94  17.83548992
                          95  36.57538670
                          96 -19.94068394
                          97 -35.88275392
                          98  17.83548992
                          99  27.31132535
                         100 -19.94068394
                         101 -26.61869257
                         102  17.83548992
                         103  18.04726399
                         104 -19.94068394
                         105 -21.60833256
                         106  16.99662503
                         107  15.59239436
                         108  0.000000000

                                               Stab    Stabkraft

                                                109  0.000000000
                                                110  0.000000000
                                                111  0.000000000
                                                112  0.000000000
                                                113  0.000000000
                                                114  0.000000000
                                                115  0.000000000
                                                116  43.46030456
                                                117 -14.62960096
                                                118 -17.29177911
                                                119 -13.44560191
                                                120  29.20771447
                                                121  1.630578727
                                                122  27.60187460
                                                123  20.60886445
                                                124  22.44154634
                                                125 -25.58719949
                                                126 -23.75451760
                                                127 -4.179827250
                                                128 -0.489765335
                                                129  0.346316390
                                                130 -0.489765335
                                                131  0.346316390
                                                132 -0.489765335
                                                133 -0.857140722
                                                134  0.684823236
                                                135 -0.484243154
                                                136  0.684823236
                                                137 -0.484243154
                                                138  0.684823236
                                                139  0.346316390
                                                140 -0.489765335
                                                141  0.346316390
                                                142 -0.489765335
                                                143 -0.780413278
                                                144 -1.863213888
                                                145  0.349011428
                                                146  0.684823236
                                                147 -0.484243154
                                                148  0.684823236
                                                149 -45.38851958
                                                150 -39.35359717
                                                151 -1.630578727
                                                152 -40.95943704
                                                153  12.72440048
                                                154 -16.58476668
                                                155 -0.489765335
                                                156  8.677315607
                                                157 -17.35463121
                                                158 -0.269084636
                                                159  0.000000000
                                                160  19.15437476
                                                161  20.12484548
                                                162  0.300845769

                                                                      Stab    Stabkraft

                                                                       163 -18.92952634
                                                                       164 -19.40306756
                                                                       165 -15.71428571
                                                                       166 -15.71428571
                                                                       167  0.000000000
                                                                       168  0.000000000
                                                                       169 -12.85714286
                                                                       170 -12.85714286
                                                                       171  0.000000000
                                                                       172  0.000000000
                                                                       173 -2.142857143
                                                                       174 -2.142857143
                                                                       175  2.142857143
                                                                       176  2.142857143
                                                                       177 -5.714285714
                                                                       178 -2.142857143
                                                                       179 -2.142857143
                                                                       180  2.142857143
                                                                       181  2.142857143
                                                                       182  38.33259390
                                                                       183  0.000000000
                                                                       184  0.346316390
                                                                       185  4.961980788
                                                                       186  1.537496060
                                                                       187  6.734190144
                                                                       188 -10.00000000
                                                                       189  0.000000000
                                                                       190 -10.00000000
                                                                       191 -5.000000000
                                                                       192 -2.142857143
                                                                       193 -2.142857143
                                                                       194  15.00000000
                                                                       195  15.00000000
                                                                       196 -11.42857143
                                                                       197  12.05662677
                                                                       198 -14.12063425
                                                                       199 -16.15254952
                                                                       200  14.58099491
                                                                       201 -2.607999313
                                                                       202 -2.828230931
                                                                       203  0.410009516
                                                                       204 -2.238032093
                                                                       205  1.214247726
                                                                       206 -9.576720193
                                                                       207  0.529057437
                                                                       208 -9.033867142
                                                                       209  1.798808790
                                                                       210 -0.542853051
                                                                       211  0.000000000
                                                                       212 -0.313416355
                                                                       213  5.215705626
                                                                       214  0.330369846
                                                                       215  0.330369846

FEM-Berechnungsmodell

63204 62 64 124

203

65

68

66

70 60 119

69

67

61

56 199 205 71

123 125

57 120 118

211 206 200 58

214

9 8

202 121

212

10

84

107 59

215

55 116

213

88

122

85

117 210

138 87

152

137

91

105

86

201

136

2 198 73

89

209

33

135

153 151 149

95

11

92

90

14

1 72

126

134

148

3

94

37

16 6

34

133

114

147

99

96

93

36

15

150

186

74

132

146

208 197 4 18 76

98

13

40

54

35

7

143

131

113

145

103

100

97

19

38

75

184

130

106 5

185

20

102

44

41

39

207 17

129

112

21

144

104

101

43

77

128

142

22

183

79

159

48

45

42

127

111

141

157

23

47

78

140

24

52

49

46

161

110

162

25

139 51

80

155

187

26 83

53

50

164

109

156 160

27

158

81 28

154

108

29

163

82 30 166 115 32 174 31 167 176 173 170 168 165 179

182

175 171

177 181 178 190 172 169 193 180 189

196 195 192 191 188 194

FEM-Berechnungsmodell

63204 62 64 124

203

65

68

66

70 60 119 69

67

61 56 199 205 71

123 125

57 120 118 211 206 200 58

214

9 8

202 121

212

10

84

107 59

215

55 116

213

88

122 85

117 210

138 87

152

137

91 105 86

201

136

2 198 73

89

209

33

135

153 151 149

95

11

92 90

14

1 72

126

134

148 3

94

12

37

16 6

34

133

114

147

99 96 93

36

15

150

186

74

132

146

208 197 4 18 76

98

13

40 54 35

7

143

131

113

145

103 100 97

19

38

75

184

130

106 5

185

20

102

44 41 39

207 17

129

112 21

144

104 101

43

77

128

142

22

183

79

159

48 45 42

127

111

141

157

23

47

78

140

24

52 49 46

161

110

162

25

139 51

80

155

187

26 83

53 50

164

109

156 160

27

158

81 28

154

108 29

163

82 30 166 115 32 174 31 167 176 173 170 168 165 179

182

175 171 177 181 178 190 172 169 193 180 189 196 195 192 191 188 194